Copyright: (c) Copyright Agilent Technologies, 1999-2002


About the 89600 Documentation

The 89600 documentation consists of a printed Installation and Service Guide, an online video demonstration, and a wealth of online documentation.  In fact, even the Installation and Service Guide is available online as a PDF file.

 See Documentation Supplied with Your 89600 VSA Software to learn more about the documentation shipped with your 89600-series analyzer.

 See Using the Online Documentation to learn how to use the online documentation.

Tip

Both of the above topics are located in the Getting Started online help.  You can access the Getting Started online help by opening the Getting Started book in the online table of contents, by clicking Getting Started from the Documentation Roadmap,  or by clicking Help, Getting Started from the main menu of any 89600-series application.


How To Use This Help File

To do this...	Click...
Display or hide the navigation pane (Contents, Index, and Search tabs)...
Display the documentation roadmap...
Browse through the online topics...
View the Table of Contents…
Display the online help index...
Search for a word or phrase...
Display a history of topics that you’ve visited…
To print a single topic...
To print an entire Book…	(in the Table of Contents)
To change the displayed font size…


Acknowledgements

The following products are mentioned in one or more places in the Agilent 89600-series documentation.

Product	Acknowledgement
Adobe® and Acrobat®	These products are trademarks of Adobe Systems Incorporated.
Microsoft®, Windows NT®, Windows®, and MS Windows®	These products are U.S. registered trademarks of Microsoft Corporation.
MS Excel, MS Word, MS Office, VBScript	These products are products of Microsoft Corporation.
MATLAB	MATLAB is a product of The MathWorks, Inc.


The Documentation Roadmap is not installed on your system.


1999-2002, Agilent Technologies


This documentation is not installed on your system.


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .


This document was not available for inclusion in the online help. You can download the PDF from the 89600 [image] Web page .